Totals

Entries 34885 Mean 707.1 RMS 137.8 / ndf

2χ 48.81 / 31 Prob 0.02199 Constant 9.2±

1113 Mean 0.9±

692 Sigma 1.2± 112.9

ADC counts

200 400 600 800 1000 1200 1400

Number of events

0

200

400

600

800

1000

1200

Jan-June 2007